/*
 Navicat Premium Data Transfer

 Source Server         : zhaoxingrui
 Source Server Type    : MySQL
 Source Server Version : 80016
 Source Host           : localhost:3306
 Source Schema         : devcloud

 Target Server Type    : MySQL
 Target Server Version : 80016
 File Encoding         : 65001

 Date: 20/04/2021 21:44:04
*/
CREATE TABLE `test_result` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `test_id` int(11) NOT NULL,
  `execute_time` datetime NOT NULL,
  `success` int(11) NOT NULL DEFAULT '0',
  `failure` int(11) NOT NULL DEFAULT '0',
  `time_list` text NOT NULL,
  `max_time` int(11) NOT NULL,
  `min_time` int(11) NOT NULL,
  `average_time` double NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=21 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

SET FOREIGN_KEY_CHECKS = 1;
