/*
 Navicat Premium Data Transfer

 Source Server         : localhost_3306
 Source Server Type    : MySQL
 Source Server Version : 80018
 Source Host           : localhost:3306
 Source Schema         : seecoder

 Target Server Type    : MySQL
 Target Server Version : 80018
 File Encoding         : 65001

 Date: 11/03/2021 09:46:42
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for tree_log
-- ----------------------------
DROP TABLE IF EXISTS `tree_log`;
CREATE TABLE `tree_log`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `time` datetime(0) NULL DEFAULT NULL,
  `operation` varchar(32) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `user_id` int(11) NULL DEFAULT NULL,
  `tree_id` int(11) NULL DEFAULT NULL,
  `user_name` varchar(64) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 3 CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tree_log
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
