SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for api_test
-- ----------------------------
create table if not exists devcloud.api_test;
CREATE TABLE `api_test` (
  `test_id` int(11) NOT NULL AUTO_INCREMENT,
  `test_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL,
  `project_id` int(11) NOT NULL,
  `create_time` datetime NOT NULL,
  `username` varchar(255) NOT NULL,
  `url` varchar(255) NOT NULL,
  `params` json DEFAULT NULL,
  `qps` int(11) NOT NULL,
  `state` varchar(255) NOT NULL,
  `execute_time` datetime DEFAULT NULL,
  `success` int(11) NOT NULL DEFAULT '0',
  `failure` int(11) NOT NULL DEFAULT '0',
  `time_list` text CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL,
  `method` varchar(255) NOT NULL,
  PRIMARY KEY (`test_id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=24 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;

SET FOREIGN_KEY_CHECKS = 1;
